1 VTEDIT
! VTEDIT.HLP -   created by TECO on  2/15/79   14:41
!                 edited by TECO on  3/ 9/79   11:58
!                 edited by TECO on  4/ 9/79   11:08
!                 edited by TECO on  4/12/79   16:21
!                 edited by TECO on  6/ 6/79   13:37
!                 edited by TECO on  6/ 7/79   11:31
!                 edited by TECO on  7/10/79   21:34
!                 edited by TECO on 10/11/79   23:38
!                 edited by TECO on 11/13/79   19:24
!                 edited by TECO on  2/28/80   17:59
!                 edited by TECO on  3/26/80   12:22
!
VTEDIT is an unsupported interactive keypad editor used in conjunction
 with the TECO text editor on VT52 and VT100 terminals.

Formats

 TECO/VT file-spec                    to edit an existing file
 TECO/VT out-file-spec=in-file-spec   to edit from one file to another
 MAKE/VT file-spec                    to create a new file

To invoke VTEDIT in its alternate modes, use the following forms of
 commands:

 TECO/VT:SE    			for VTEDIT in SEEALL mode
 TECO/VT:HO    			for VTEDIT in hold screen mode
 TECO/VT:SE:HO 			for VTEDIT in SEEALL+hold mode

Complete documentation on VTEDIT can be obtained by printing or
 typing the file VTEDIT.DOC.
2 Initialization of VTEDIT
VTEDIT can be automatically invoked.

If you have a TECO.INI in your directory, it can indicate to
 TECO that you wish VTEDIT automatically invoked.  TECO provides
 a flag saying whether your terminal is a scope type terminal
 capable of being used by VTEDIT.  By testing this flag, you can
 use VTEDIT whenever you are using a scope terminal.

The macro in TECO.INI should exit with the following value:
      ET&512"N 1+ ' 0           to invoke VTEDIT in normal mode
      ET&512"N 1+16+ ' 0        to invoke VTEDIT in SEEALL mode
      ET&512"N 1+32+ ' 0        to invoke VTEDIT in hold screen mode
      ET&512"N 1+16+32+ ' 0     to invoke VTEDIT in SEEALL and hold modes
2 Location of VTEDIT
The VTEDIT keypad editing macro is normally located as
      LB:[1,2]VTEDIT.TEC

TECO will search your current default directory for a private
 version of VTEDIT.TEC before going to LB:[1,2].
2 Alternates to VTEDIT
If you have an editing macro that you wish to use instead of VTEDIT,
 name it VTEDIT.TEC and place it in your directory. Then, by including
 the /VTEDIT switch in your TECO invocation or by automatically asking
 for VTEDIT with your private initializer, TECO will load your macro
 instead of VTEDIT.
